<template>
	<view>
		<scroll-view scroll-y class="page">
			<cu-custom bgColor="bg-cyan" :isBack="true"><block slot="backText">返回</block><block slot="content">关于我们</block></cu-custom>
			<view class='margin-xl bg-white padding-xl radius shadow-lg'>
			  <view class='text-center margin-bottom text-lg  text-grey'>关于智感云医废物联</view>
			  <view class='text-content'>
			    <view>Hi！欢迎使用智感云医废物联！</view>
			    <view class='margin-top-sm'>OpMonitor（智感云），全称为Operation Monitor，利用成熟的物联网、信息化、人工智能技术，实现医疗场景内各类流程的严格、高标准管理。以便捷的安装、部署方式实现原有业务系统升级，全程可控，最终实现智能化精细管理。</view>
			    <view class='margin-top-sm'>医废物联致力于让每一次操作都生成一条数据、让每一个流程都由智慧平台支撑、让每一条规范与先进经验都落到日常操作中。</view>
			    <view class='margin-top-sm'>更多功能敬请期待！</view>
			  </view>
			</view>
		</scroll-view>
	</view>
</template>

<script>
	export default {
		data() {
			return {}
		}
	} 
</script>

<style>
	.page {
		width: 100vw;
		height: 100Vh;
	}
	
	.UCenter-bg {
	  background-image: url(https://image.weilanwl.com/color2.0/index.jpg);
	  background-size: cover;
	  height: 700rpx;
	  display: flex;
	  justify-content: center;
	  padding-top: 40rpx;
	  overflow: hidden;
	  position: relative;
	  flex-direction: column;
	  align-items: center;
	  color: #fff;
	  font-weight: 300;
	  text-shadow: 0 0 3px rgba(0,0,0,0.3);
	}
	.UCenter-bg text{
	  opacity: 0.8;
	}
	.UCenter-bg image {
	  width: 250rpx;
	  height: 250rpx;
	}
	
	.UCenter-bg .animation-wave {
	  position: absolute;
	  bottom: 0;
	}
</style>
